 Basic ^variantname Message Flow Control

   ^variantname supports the following basic message flow controls.  To use
 these, simply type the first letter of each command while messages are flowing
 (displaying).  (If you don't know how to display messages, see .Help READ,
 but these basically boils down to <N>ew, <O>ld, <F>orward, <R>everse, and their
 advanced variants).

 <P>ause - This causes the message flow to temporarily stop.  Hitting nearly
 any key will restart output (but see the advanced section below for an
 exception).

 <S>top - This stops the message flow and returns you to the room prompt.

 <N>ext - This stops displaying the current message and begins displaying
 the next message.  If this is the last message to be displayed, you are returned
 to the room prompt.

 <J>ump - This causes the display of the current paragraph to stop and jump
 to the next paragraph of the current message.  If this was the last message,
 Citadel will start displaying the next message.

 %COMMANDS Back to the commands help menu.
 %HELPOPT Get a list of all help files in the system.
 %MAINHELP First level of help system.

